declare
    column_exists exception;
    pragma exception_init (column_exists , -01430);
begin
    execute immediate 'ALTER TABLE AUDITORIA_CHAVE MODIFY VALOR VARCHAR2(600 BYTE)';
    exception when column_exists then null;
end;