declare
    object_exists exception;
    pragma exception_init (object_exists , -00955);
begin
    execute immediate 'update custom set tipo = ''1'' where chave = ''MODCLI_ImprimeComprovanteCartaoImpressoraTermica''';
    exception when object_exists then null;
end;