declare 
  column_exists exception;
  pragma exception_init (column_exists , -01430);
begin 
  execute immediate 'ALTER TABLE AG_VNCTO_CARTAO_CTAS_RECEBER ADD (sequencial NUMBER(7) DEFAULT 1 NOT NULL)';
  exception when column_exists then null;
end;
