declare

    column_exists exception;

    pragma exception_init (column_exists , -01430);

begin

    execute immediate 'ALTER TABLE CHECKIN_AUTOMATICO MODIFY CHECKINAUTOMATICO_ID NUMBER(15,0)';

    exception when column_exists then null;

end;
/
