declare 
  column_exists exception;
  pragma exception_init (column_exists , -01430);
begin 
  execute immediate 'ALTER TABLE AG_CONTAS_RECEBER ADD (TIPOCONTARECEBER NUMBER(1) DEFAULT 1)';
  exception when column_exists then null;
end;
